Index: doc/System/DSoilModel - Test Plan/DSoilModel - Test Plan.tex
===================================================================
diff -u -r161 -r165
--- doc/System/DSoilModel - Test Plan/DSoilModel - Test Plan.tex	(.../DSoilModel - Test Plan.tex)	(revision 161)
+++ doc/System/DSoilModel - Test Plan/DSoilModel - Test Plan.tex	(.../DSoilModel - Test Plan.tex)	(revision 165)
@@ -63,8 +63,8 @@
 
 \textbf{\footnotesize{Samenvatting}} \newline
 Dit document bevat de 2$^{\text{de}}$ versie van het testplan voor \DSOILMODEL, inclusief de commentaren van H. Walls (Rijkswaterstaat).}
-}
 
+
 \authori{dr. V. Trompille}
 \revieweri{P. Witlox \newline ir. K.S. Lam}
 \approvali{ir. J. Icke}
@@ -86,7 +86,7 @@
 
 \section{Purpose and scope of this document}
 
-This document contains the test plan design for \DSOILMODEL. 
+This document contains the test plan for \DSOILMODEL. 
 
 The document will not give any background on the context of the WTI project. For this purpose the reader is referred to the WTI2017 and to its supporting technical reports and their background reports underneath (paragraph 1.3). 
 
@@ -151,7 +151,7 @@
 
 \section{Code coverage}\label{sec:1.5}
 
-Testing is considered to be ok when all the unit tests pass and when the code coverage of those tests is more than 60\% so as prescribed in \cite{OverallTestPlanWTI}. 
+Testing is considered to be ok when all the unit tests pass and when the code coverage of those tests is more than 60\% so as prescribed in \cite{OverallTestPlanWTI} because it is a Delta Shell Light product.
 
 To determine the code coverage of the \textit{Calculation} components, the feature `Code coverage' of Visual Studio can be used. This tool shows the percentage of the code that was tested in each assembly, class, and method, and is visible on the build server.
 
@@ -194,7 +194,8 @@
 
 As \DSOILMODEL is a database and support software for schematize the subsoil, the system testing will only consist of executing test scripts and common tests for general User Interface functionalities. 
 
-A Test Script will be provided to the tester, describing a sequence of actions and the expected outcome. An overview of the Test Scripts is listed below:
+
+A Test Script will be provided to the tester, describing a sequence of actions and the expected outcome. Another goal of the test script is testing against the functional and non-functional requirments in the Functional Design. An overview of the Test Scripts is listed below:
 \begin{itemize}
 	\item \textbf{Language:} \newline
 	The test must be done only for Dutch language.
