Index: DamClients/DamUI/trunk/doc/DAM UI - Functional Design/CalcSettings.tex
===================================================================
diff -u -r4536 -r6975
--- DamClients/DamUI/trunk/doc/DAM UI - Functional Design/CalcSettings.tex	(.../CalcSettings.tex)	(revision 4536)
+++ DamClients/DamUI/trunk/doc/DAM UI - Functional Design/CalcSettings.tex	(.../CalcSettings.tex)	(revision 6975)
@@ -1,5 +1,6 @@
 \chapter{Calculation settings}\label{sec:USCalcSettings}
-All calculation settings are the same for all dike rings and locations within the project. So there is only one set of calculation settings.
+All calculation settings are the same for all locations within the project. 
+So there is only one set of calculation settings.
 
 \section{Macrostability}\label{sec:Macrostability}
 In DAM the following models for Stability Inside can be used:
