Index: DamClients/DamUI/trunk/doc/DAM UI - Technical Design/DAM UI - Technical Design.tex
===================================================================
diff -u -r3568 -r3584
--- DamClients/DamUI/trunk/doc/DAM UI - Technical Design/DAM UI - Technical Design.tex	(.../DAM UI - Technical Design.tex)	(revision 3568)
+++ DamClients/DamUI/trunk/doc/DAM UI - Technical Design/DAM UI - Technical Design.tex	(.../DAM UI - Technical Design.tex)	(revision 3584)
@@ -7,7 +7,7 @@
 \cleardoublepage
 %
 
-\newcommand{\ProgramName}{DAM UI}
+\newcommand{\ProgramName}{DAM UI\xspace}
 \newcommand{\ProgramNamePlusSpace}{DAM UI }
 
 \title{\ProgramName}
@@ -28,8 +28,6 @@
 
 \keywords{Dike, safety assessment, design, software, macro stability, piping}
 
-\reference{Refer to \autoref{chapterLiterature}.}
-
 \summary{This document contains the technical design for \ProgramName, an application that computes the strength of a complete dikering with respect to several failure mechnanisms, such as macro stability and piping.\newline
 \newline
 \textbf{\footnotesize{Samenvatting}} \newline
@@ -164,7 +162,7 @@
 \section{Results}
 First of all,
 not all calculations will pass kernel validations or lead to valid results due to errors that occur in the calculations (e.g. uplift does not occur where it is expected). 
-Some calculations may be performed but causes warnings.
+Some calculations may be performed but cause warnings.
 Using a log manager, 
 all these cases are reported back to the user via a log that is to be displayed at the end of the calculation process.
 This log is cleared at the start of each new calculation process.
