Index: Application/Ringtoets/src/Application.Ringtoets.Storage/DbContext/DatabaseStructure.sql
===================================================================
diff -u -r1d4574dd23b04f1b4dfa71f93edc1910d151d705 -rbfe36d6bae8c85e941d20cd6f150f022445d3ac2
--- Application/Ringtoets/src/Application.Ringtoets.Storage/DbContext/DatabaseStructure.sql	(.../DatabaseStructure.sql)	(revision 1d4574dd23b04f1b4dfa71f93edc1910d151d705)
+++ Application/Ringtoets/src/Application.Ringtoets.Storage/DbContext/DatabaseStructure.sql	(.../DatabaseStructure.sql)	(revision bfe36d6bae8c85e941d20cd6f150f022445d3ac2)
@@ -1,6 +1,6 @@
 /* ---------------------------------------------------- */
 /*  Generated by Enterprise Architect Version 12.0 		*/
-/*  Created On : 08-Dec-2016 14:40:26 				*/
+/*  Created On : 09-Dec-2016 6:34:33 AM 				*/
 /*  DBMS       : SQLite 								*/
 /* ---------------------------------------------------- */
 
@@ -377,8 +377,6 @@
 (
 	'HydraulicLocationEntityId' INTEGER NOT NULL PRIMARY KEY AUTOINCREMENT,
 	'AssessmentSectionEntityId' INTEGER NOT NULL,
-	'DesignWaterLevelOutput' INTEGER,
-	'WaveHeightOutput' INTEGER,
 	'LocationId' INTEGER NOT NULL,
 	'Name' VARCHAR (260) NOT NULL,
 	'LocationX' REAL,
@@ -949,8 +947,6 @@
 (
 	'GrassCoverErosionOutwardsHydraulicLocationEntityId' INTEGER NOT NULL PRIMARY KEY AUTOINCREMENT,
 	'FailureMechanismEntityId' INTEGER NOT NULL,
-	'DesignWaterLevelOutput' INTEGER,
-	'WaveHeightOutput' INTEGER,
 	'LocationId' INTEGER NOT NULL,
 	'Name' VARCHAR (260) NOT NULL,
 	'LocationX' REAL,
