Index: Application/Ringtoets/src/Application.Ringtoets.Storage/DbContext/DatabaseStructure.sql
===================================================================
diff -u -r3b154768800db81f1cf35b68248bcc53f417c90a -r5b4d76a9812fa9c9f06529c05fe47d6aafdb479c
--- Application/Ringtoets/src/Application.Ringtoets.Storage/DbContext/DatabaseStructure.sql	(.../DatabaseStructure.sql)	(revision 3b154768800db81f1cf35b68248bcc53f417c90a)
+++ Application/Ringtoets/src/Application.Ringtoets.Storage/DbContext/DatabaseStructure.sql	(.../DatabaseStructure.sql)	(revision 5b4d76a9812fa9c9f06529c05fe47d6aafdb479c)
@@ -1,6 +1,6 @@
 /* ---------------------------------------------------- */
 /*  Generated by Enterprise Architect Version 12.0 		*/
-/*  Created On : 25-Oct-2016 8:28:00 AM 				*/
+/*  Created On : 25-okt-2016 9:42:54 				*/
 /*  DBMS       : SQLite 								*/
 /* ---------------------------------------------------- */
 
@@ -165,6 +165,9 @@
 DROP TABLE IF EXISTS 'HeightStructuresCalculationEntity'
 ;
 
+DROP TABLE IF EXISTS 'ClosingStructureEntity'
+;
+
 /* Create Tables with Primary and Foreign Keys, Check and Unique Constraints */
 
 CREATE TABLE 'VersionEntity'
@@ -914,6 +917,43 @@
 )
 ;
 
+CREATE TABLE 'ClosingStructureEntity'
+(
+	'ClosingStructureEntityId' INTEGER NOT NULL PRIMARY KEY AUTOINCREMENT,
+	'FailureMechanismEntityId' INTEGER NOT NULL,
+	'Order' INT (4) NOT NULL,
+	'Name' VARCHAR (260),
+	'Id' VARCHAR (260),
+	'X' REAL,
+	'Y' REAL,
+	'StructureNormalOrientation' REAL,
+	'StorageStructureAreaMean' REAL,
+	'StorageStructureAreaCoefficientOfVariation' REAL,
+	'AllowedLevelIncreaseStorageMean' REAL,
+	'AllowedLevelIncreaseStorageStandardDeviation' REAL,
+	'WidthFlowAperturesMean' REAL,
+	'WidthFlowAperturesCoefficientOfVariation' REAL,
+	'LevelCrestStructureNotClosingMean' REAL,
+	'LevelCrestStructureNotClosingStandardDeviation' REAL,
+	'InsideWaterLevelMean' REAL,
+	'InsideWaterLevelStandardDeviation' REAL,
+	'ThresholdHeightOpenWeirMean' REAL,
+	'ThresholdHeightOpenWeirStandardDeviation' REAL,
+	'AreaFlowAperturesMean' REAL,
+	'AreaFlowAperturesStandardDeviation' REAL,
+	'CriticalOvertoppingDischargeMean' REAL,
+	'CriticalOvertoppingDischargeCoefficientOfVariation' REAL,
+	'FlowWidthAtBottomProtectionMean' REAL,
+	'FlowWidthAtBottomProtectionStandardDeviation' REAL,
+	'ProbabilityOpenStructureBeforeFlooding' REAL,
+	'FailureProbabilityOpenStructure' REAL,
+	'IdenticalApertures' REAL,
+	'FailureProbabilityReparation' REAL,
+	'InflowModelType' TINYINT (1),
+	CONSTRAINT 'FK_ClosingStructureEntity_FailureMechanismEntity' FOREIGN KEY ('FailureMechanismEntityId') REFERENCES 'FailureMechanismEntity' ('FailureMechanismEntityId') ON DELETE Cascade ON UPDATE Cascade
+)
+;
+
 /* Create Indexes and Triggers */
 
 CREATE INDEX 'IXFK_PipingFailureMechanismMetaEntity_FailureMechanismEntity'
@@ -1179,3 +1219,7 @@
 CREATE INDEX 'IXFK_HeightStructuresCalculationEntity_HydraulicLocationEntity'
  ON 'HeightStructuresCalculationEntity' ('HydraulicLocationEntityId' ASC)
 ;
+
+CREATE INDEX 'IXFK_ClosingStructureEntity_FailureMechanismEntity'
+ ON 'ClosingStructureEntity' ('FailureMechanismEntityId' ASC)
+;
