Index: Application/Ringtoets/src/Application.Ringtoets.Storage/DbContext/DatabaseStructure.sql
===================================================================
diff -u -r4f92f7d10dc5db623169cf9ff52f506ce0238e9f -rf4718385197b407ba9df173dfc6f4df74b75f4e1
--- Application/Ringtoets/src/Application.Ringtoets.Storage/DbContext/DatabaseStructure.sql	(.../DatabaseStructure.sql)	(revision 4f92f7d10dc5db623169cf9ff52f506ce0238e9f)
+++ Application/Ringtoets/src/Application.Ringtoets.Storage/DbContext/DatabaseStructure.sql	(.../DatabaseStructure.sql)	(revision f4718385197b407ba9df173dfc6f4df74b75f4e1)
@@ -1,6 +1,6 @@
 /* ---------------------------------------------------- */
 /*  Generated by Enterprise Architect Version 12.0 		*/
-/*  Created On : 04-aug-2016 11:21:18 				*/
+/*  Created On : 05-aug-2016 09:03:36 				*/
 /*  DBMS       : SQLite 								*/
 /* ---------------------------------------------------- */
 
@@ -142,6 +142,7 @@
 	'PipingFailureMechanismMetaEntityId' INTEGER NOT NULL PRIMARY KEY AUTOINCREMENT,
 	'FailureMechanismEntityId' INTEGER,
 	'A' REAL NOT NULL,
+	'UpliftCriticalSafetyFactor' REAL NOT NULL,
 	CONSTRAINT 'FK_PipingFailureMechanismMetaEntity_FailureMechanismEntity' FOREIGN KEY ('FailureMechanismEntityId') REFERENCES 'FailureMechanismEntity' ('FailureMechanismEntityId') ON DELETE Cascade ON UPDATE Cascade
 )
 ;
