Index: Application/Ringtoets/src/Application.Ringtoets.Storage/DbContext/DatabaseStructure.sql
===================================================================
diff -u -r9f192d2deed876584c9b69cfc2f600d906674fa2 -rac5da35861aeeaaab57c029d1dc7f6ed47013d25
--- Application/Ringtoets/src/Application.Ringtoets.Storage/DbContext/DatabaseStructure.sql	(.../DatabaseStructure.sql)	(revision 9f192d2deed876584c9b69cfc2f600d906674fa2)
+++ Application/Ringtoets/src/Application.Ringtoets.Storage/DbContext/DatabaseStructure.sql	(.../DatabaseStructure.sql)	(revision ac5da35861aeeaaab57c029d1dc7f6ed47013d25)
@@ -1,6 +1,6 @@
 /* ---------------------------------------------------- */
 /*  Generated by Enterprise Architect Version 12.0 		*/
-/*  Created On : 25-Oct-2016 11:06:52 AM 				*/
+/*  Created On : 25-okt-2016 11:47:35 				*/
 /*  DBMS       : SQLite 								*/
 /* ---------------------------------------------------- */
 
@@ -952,9 +952,9 @@
 	'FlowWidthAtBottomProtectionStandardDeviation' REAL,
 	'ProbabilityOpenStructureBeforeFlooding' REAL,
 	'FailureProbabilityOpenStructure' REAL,
-	'IdenticalApertures' REAL,
+	'IdenticalApertures' INT (4) NOT NULL,
 	'FailureProbabilityReparation' REAL,
-	'InflowModelType' TINYINT (1),
+	'InflowModelType' TINYINT (1) NOT NULL, -- Enum. VerticalWall = 1, LowSill = 2, FloodedCulvert  =3
 	CONSTRAINT 'FK_ClosingStructureEntity_FailureMechanismEntity' FOREIGN KEY ('FailureMechanismEntityId') REFERENCES 'FailureMechanismEntity' ('FailureMechanismEntityId') ON DELETE Cascade ON UPDATE Cascade
 )
 ;
