Index: Application/Ringtoets/src/Application.Ringtoets.Storage/DbContext/DatabaseStructure.sql
===================================================================
diff -u -rd3eaf9dfba5fcc97f9a4b2e901e37ea83387bac2 -r0a571f01845e933a1c290776f90b23df394debd6
--- Application/Ringtoets/src/Application.Ringtoets.Storage/DbContext/DatabaseStructure.sql	(.../DatabaseStructure.sql)	(revision d3eaf9dfba5fcc97f9a4b2e901e37ea83387bac2)
+++ Application/Ringtoets/src/Application.Ringtoets.Storage/DbContext/DatabaseStructure.sql	(.../DatabaseStructure.sql)	(revision 0a571f01845e933a1c290776f90b23df394debd6)
@@ -1,6 +1,6 @@
 /* ---------------------------------------------------- */
 /*  Generated by Enterprise Architect Version 12.0 		*/
-/*  Created On : 27-okt-2016 11:34:03 				*/
+/*  Created On : 27-okt-2016 15:12:09 				*/
 /*  DBMS       : SQLite 								*/
 /* ---------------------------------------------------- */
 
@@ -1016,9 +1016,9 @@
 	'FlowWidthAtBottomProtectionStandardDeviation' REAL,
 	'ProbabilityOpenStructureBeforeFlooding' REAL,
 	'FailureProbabilityOpenStructure' REAL NOT NULL,
-	'IdenticalApertures' REAL,
+	'IdenticalApertures' INT (4) NOT NULL,
 	'FailureProbablityReparation' REAL NOT NULL,
-	'InflowModelType' TINYINT (1),
+	'InflowModelType' TINYINT (1) NOT NULL,
 	'FailureProbabilityStructureWithErosion' REAL NOT NULL,
 	'DeviationWaveDirection' REAL,
 	'DrainCoefficientMean' REAL,
