Index: Application/Ringtoets/src/Application.Ringtoets.Storage/DbContext/DatabaseStructure.sql
===================================================================
diff -u -rd912f6a5edd00d9dfa1af486e61afd9e7c10b766 -r1743a40d015bd40d090c6d107f79d87594e90efd
--- Application/Ringtoets/src/Application.Ringtoets.Storage/DbContext/DatabaseStructure.sql	(.../DatabaseStructure.sql)	(revision d912f6a5edd00d9dfa1af486e61afd9e7c10b766)
+++ Application/Ringtoets/src/Application.Ringtoets.Storage/DbContext/DatabaseStructure.sql	(.../DatabaseStructure.sql)	(revision 1743a40d015bd40d090c6d107f79d87594e90efd)
@@ -1,6 +1,6 @@
 /* ---------------------------------------------------- */
 /*  Generated by Enterprise Architect Version 12.0 		*/
-/*  Created On : 05-Dec-2016 08:39:22 				*/
+/*  Created On : 05-Dec-2016 10:30:30 				*/
 /*  DBMS       : SQLite 								*/
 /* ---------------------------------------------------- */
 
@@ -282,6 +282,7 @@
 	'PipingFailureMechanismMetaEntityId' INTEGER NOT NULL PRIMARY KEY AUTOINCREMENT,
 	'FailureMechanismEntityId' INTEGER NOT NULL,
 	'A' REAL NOT NULL,
+	'WaterVolumetricWeight' REAL NOT NULL,
 	CONSTRAINT 'FK_PipingFailureMechanismMetaEntity_FailureMechanismEntity' FOREIGN KEY ('FailureMechanismEntityId') REFERENCES 'FailureMechanismEntity' ('FailureMechanismEntityId') ON DELETE Cascade ON UPDATE Cascade
 )
 ;
