Index: Application/Ringtoets/src/Application.Ringtoets.Storage/DbContext/DatabaseStructure.sql
===================================================================
diff -u -rdb6506035368f043c476a528c324f1a093759fca -r46b7b8c7ae08c83f5a21504d5e1f2f47b33b5e40
--- Application/Ringtoets/src/Application.Ringtoets.Storage/DbContext/DatabaseStructure.sql	(.../DatabaseStructure.sql)	(revision db6506035368f043c476a528c324f1a093759fca)
+++ Application/Ringtoets/src/Application.Ringtoets.Storage/DbContext/DatabaseStructure.sql	(.../DatabaseStructure.sql)	(revision 46b7b8c7ae08c83f5a21504d5e1f2f47b33b5e40)
@@ -1097,7 +1097,7 @@
 	'ProbabilityOpenStructureBeforeFlooding' REAL NOT NULL,
 	'FailureProbabilityOpenStructure' REAL NOT NULL,
 	'IdenticalApertures' INT (4) NOT NULL,
-	'FailureProbablityReparation' REAL NOT NULL,
+	'FailureProbabilityReparation' REAL NOT NULL,
 	'InflowModelType' TINYINT (1) NOT NULL,
 	'FailureProbabilityStructureWithErosion' REAL NOT NULL,
 	'DeviationWaveDirection' REAL,
