Index: build/DatabaseStructure.sql
===================================================================
diff -u -r0641053e020a1478f793ee17e753df60af26171f -re08b5ce64ea11d4f631c96acf8c7bf7f33865f78
--- build/DatabaseStructure.sql	(.../DatabaseStructure.sql)	(revision 0641053e020a1478f793ee17e753df60af26171f)
+++ build/DatabaseStructure.sql	(.../DatabaseStructure.sql)	(revision e08b5ce64ea11d4f631c96acf8c7bf7f33865f78)
@@ -1,6 +1,6 @@
 /* ---------------------------------------------------- */
 /*  Generated by Enterprise Architect Version 12.0 		*/
-/*  Created On : 20-Sep-2017 9:43:01 AM 				*/
+/*  Created On : 20-Sep-2017 10:49:48 AM 				*/
 /*  DBMS       : SQLite 								*/
 /* ---------------------------------------------------- */
 
@@ -619,9 +619,9 @@
 	'MaterialName' TEXT NOT NULL,
 	'BelowPhreaticLevelMean' REAL,
 	'BelowPhreaticLevelDeviation' REAL,
+	'BelowPhreaticLevelShift' REAL,
 	'DiameterD70Mean' REAL,
 	'DiameterD70CoefficientOfVariation' REAL,
-	'BelowPhreaticLevelShift' REAL,
 	'PermeabilityMean' REAL,
 	'PermeabilityCoefficientOfVariation' REAL,
 	'Order' INT (4) NOT NULL,
