Index: build/DatabaseStructure.sql
===================================================================
diff -u -r152d876c8422b581f07e7798dd49263554d04f7e -r71e49e681a9673ff35949c7619102e610f8575c7
--- build/DatabaseStructure.sql	(.../DatabaseStructure.sql)	(revision 152d876c8422b581f07e7798dd49263554d04f7e)
+++ build/DatabaseStructure.sql	(.../DatabaseStructure.sql)	(revision 71e49e681a9673ff35949c7619102e610f8575c7)
@@ -1,6 +1,6 @@
 /* ---------------------------------------------------- */
 /*  Generated by Enterprise Architect Version 14.1 		*/
-/*  Created On : 05-feb-2021 08:37:48 				*/
+/*  Created On : 08-feb-2021 09:53:06 				*/
 /*  DBMS       : SQLite 								*/
 /* ---------------------------------------------------- */
 
@@ -1643,7 +1643,7 @@
 	'DampingFactorExitMean' REAL NULL,
 	'DampingFactorExitStandardDeviation' REAL NULL,
 	'RelevantForScenario' TINYINT (1) NOT NULL,	-- true or false
-	'ScenarioContribution' REAL NULL,
+	'ScenarioContribution' REAL NOT NULL,
 	'ShouldProfileSpecificIllustrationPointsBeCalculated' TINYINT (1) NOT NULL,	-- true or false
 	'ShouldSectionSpecificIllustrationPointsBeCalculated' TINYINT (1) NOT NULL,	-- true or false
 	CONSTRAINT 'FK_ProbabilisticPipingCalculationEntity_CalculationGroupEntity' FOREIGN KEY ('CalculationGroupEntityId') REFERENCES 'CalculationGroupEntity' ('CalculationGroupEntityId') ON DELETE Cascade ON UPDATE Cascade,
