Index: build/DatabaseStructure.sql
===================================================================
diff -u -r155b57bdd33a2432fb26c0aa89b27b4da0fbd1e0 -r7067c14b776869db0ee508758b5ebed71b06045c
--- build/DatabaseStructure.sql	(.../DatabaseStructure.sql)	(revision 155b57bdd33a2432fb26c0aa89b27b4da0fbd1e0)
+++ build/DatabaseStructure.sql	(.../DatabaseStructure.sql)	(revision 7067c14b776869db0ee508758b5ebed71b06045c)
@@ -1,6 +1,6 @@
 /* ---------------------------------------------------- */
 /*  Generated by Enterprise Architect Version 12.0 		*/
-/*  Created On : 03-Aug-2018 12:51:59 				*/
+/*  Created On : 03-Aug-2018 13:15:35 				*/
 /*  DBMS       : SQLite 								*/
 /* ---------------------------------------------------- */
 
@@ -874,7 +874,7 @@
 	'SimpleAssessmentResult' TINYINT (1) NOT NULL, -- Enum: 1 = None, 2 = NotApplicable, 3 = ProbabilityNegligible, 4 = AssessFurther
 	'TailorMadeAssessmentResult' TINYINT (1) NOT NULL, -- Enum: 1 = None, 2 = ProbabilityNegligible, 3 = Sufficient, 4 = Insufficient, 5 = NotAssessed
 	'UseManualAssemblyCategoryGroup' TINYINT (1) NOT NULL, -- true or false
-	'ManualAssemblyCategoryGroup' TINYINT (1) NOT NULL, -- Enum: 1 = None, 2 = NotApplicable, 3 = Iv, 4 = IIv, 5 = IIIv, 6 = IVv, 7 = Vv, 8 = VIv, 9 = VIIv
+	'ManualAssemblyCategoryGroup' TINYINT (1) NOT NULL, -- Enum: 1 = None, 2 = NotApplicable, 3 = Iv, 4 = IIv, 5 = Vv, 6 = VIIv  
 	CONSTRAINT 'FK_WaterPressureAsphaltCoverSectionResultEntity_FailureMechanismSectionEntity' FOREIGN KEY ('FailureMechanismSectionEntityId') REFERENCES 'FailureMechanismSectionEntity' ('FailureMechanismSectionEntityId') ON DELETE Cascade ON UPDATE Cascade
 )
 ;
