Index: build/DatabaseStructure.sql
===================================================================
diff -u -r280802fc6ecb02c236b48bbbc4ce3092b89a7d39 -r8e8f8c83c45656f65adaa8e47600379dc5ae8f61
--- build/DatabaseStructure.sql	(.../DatabaseStructure.sql)	(revision 280802fc6ecb02c236b48bbbc4ce3092b89a7d39)
+++ build/DatabaseStructure.sql	(.../DatabaseStructure.sql)	(revision 8e8f8c83c45656f65adaa8e47600379dc5ae8f61)
@@ -257,7 +257,7 @@
 	'AllowedLevelIncreaseStorageMean' REAL,
 	'AllowedLevelIncreaseStorageStandardDeviation' REAL,
 	'WidthFlowAperturesMean' REAL,
-	'WidthFlowAperturesCoefficientOfVariation' REAL,
+	'WidthFlowAperturesStandardDeviation' REAL,
 	'InsideWaterLevelMean' REAL,
 	'InsideWaterLevelStandardDeviation' REAL,
 	'ThresholdHeightOpenWeirMean' REAL,
@@ -1042,7 +1042,7 @@
 	'CriticalOvertoppingDischargeMean' REAL,
 	'CriticalOvertoppingDischargeCoefficientOfVariation' REAL,
 	'WidthFlowAperturesMean' REAL,
-	'WidthFlowAperturesCoefficientOfVariation' REAL,
+	'WidthFlowAperturesStandardDeviation' REAL,
 	'FailureProbabilityStructureWithErosion' REAL,
 	'StorageStructureAreaMean' REAL,
 	'StorageStructureAreaCoefficientOfVariation' REAL,
@@ -1074,7 +1074,7 @@
 	'CriticalOvertoppingDischargeCoefficientOfVariation' REAL,
 	'FailureProbabilityStructureWithErosion' REAL NOT NULL,
 	'WidthFlowAperturesMean' REAL,
-	'WidthFlowAperturesCoefficientOfVariation' REAL,
+	'WidthFlowAperturesStandardDeviation' REAL,
 	'StormDurationMean' REAL,
 	'LevelCrestStructureMean' REAL,
 	'LevelCrestStructureStandardDeviation' REAL,
@@ -1105,7 +1105,7 @@
 	'AllowedLevelIncreaseStorageMean' REAL,
 	'AllowedLevelIncreaseStorageStandardDeviation' REAL,
 	'WidthFlowAperturesMean' REAL,
-	'WidthFlowAperturesCoefficientOfVariation' REAL,
+	'WidthFlowAperturesStandardDeviation' REAL,
 	'LevelCrestStructureNotClosingMean' REAL,
 	'LevelCrestStructureNotClosingStandardDeviation' REAL,
 	'InsideWaterLevelMean' REAL,
@@ -1148,7 +1148,7 @@
 	'AllowedLevelIncreaseStorageMean' REAL,
 	'AllowedLevelIncreaseStorageStandardDeviation' REAL,
 	'WidthFlowAperturesMean' REAL,
-	'WidthFlowAperturesCoefficientOfVariation' REAL,
+	'WidthFlowAperturesStandardDeviation' REAL,
 	'LevelCrestStructureNotClosingMean' REAL,
 	'LevelCrestStructureNotClosingStandardDeviation' REAL,
 	'InsideWaterLevelMean' REAL,
@@ -1208,7 +1208,7 @@
 	'AllowedLevelIncreaseStorageMean' REAL,
 	'AllowedLevelIncreaseStorageStandardDeviation' REAL,
 	'WidthFlowAperturesMean' REAL,
-	'WidthFlowAperturesCoefficientOfVariation' REAL,
+	'WidthFlowAperturesStandardDeviation' REAL,
 	'InsideWaterLevelMean' REAL,
 	'InsideWaterLevelStandardDeviation' REAL,
 	'ThresholdHeightOpenWeirMean' REAL,
