Index: build/DatabaseStructure.sql
===================================================================
diff -u -r4617dd7727849e7c05d315098d48f3616f31ac72 -r164be9806e1f1d1b47c2be442b9fe4c33b21c172
--- build/DatabaseStructure.sql	(.../DatabaseStructure.sql)	(revision 4617dd7727849e7c05d315098d48f3616f31ac72)
+++ build/DatabaseStructure.sql	(.../DatabaseStructure.sql)	(revision 164be9806e1f1d1b47c2be442b9fe4c33b21c172)
@@ -1,6 +1,6 @@
 /* ---------------------------------------------------- */
 /*  Generated by Enterprise Architect Version 12.0 		*/
-/*  Created On : 08-Aug-2018 11:05:34 				*/
+/*  Created On : 10-Sep-2018 10:04:29 				*/
 /*  DBMS       : SQLite 								*/
 /* ---------------------------------------------------- */
 
@@ -486,7 +486,6 @@
 	'LoadSchematizationType' TINYINT (1) NOT NULL, -- Enum: 1 = Linear, 2 = Quadratic
 	'VolumicWeightWater' REAL,
 	'StormDurationMean' REAL,
-	'ModelFactorSuperCriticalFlowMean' REAL,
 	'FactorStormDurationOpenStructure' REAL,
 	'DrainCoefficientMean' REAL,
 	'FailureProbabilityStructureWithErosion' REAL NOT NULL,
