Index: build/DatabaseStructure.sql
===================================================================
diff -u -r62365fed1bd7533a3dfbb9171c8e8d463f0b1bcc -r39e91a31e125013f4d029236729eb1da4beecdcf
--- build/DatabaseStructure.sql	(.../DatabaseStructure.sql)	(revision 62365fed1bd7533a3dfbb9171c8e8d463f0b1bcc)
+++ build/DatabaseStructure.sql	(.../DatabaseStructure.sql)	(revision 39e91a31e125013f4d029236729eb1da4beecdcf)
@@ -1,6 +1,6 @@
 /* ---------------------------------------------------- */
 /*  Generated by Enterprise Architect Version 15.2 		*/
-/*  Created On : 21-jan-2022 08:08:08 				*/
+/*  Created On : 24-jan-2022 08:09:58 				*/
 /*  DBMS       : SQLite 								*/
 /* ---------------------------------------------------- */
 
@@ -2178,15 +2178,13 @@
 (
 	'WaveImpactAsphaltCoverSectionResultEntityId' INTEGER NOT NULL PRIMARY KEY AUTOINCREMENT,
 	'FailureMechanismSectionEntityId' INTEGER NOT NULL,
-	'SimpleAssessmentResult' TINYINT (1) NOT NULL,	-- Enum: 1 = None, 2 = NotApplicable, 3 = ProbabilityNegligible, 4 = AssessFurther
-	'DetailedAssessmentResultForFactorizedSignalingNorm' TINYINT (1) NOT NULL,	-- Enum: 1 = None, 2 = Sufficient, 3 = Insufficient, 4 = NotAssessed
-	'DetailedAssessmentResultForSignalingNorm' TINYINT (1) NOT NULL,	-- Enum: 1 = None, 2 = Sufficient, 3 = Insufficient, 4 = NotAssessed
-	'DetailedAssessmentResultForMechanismSpecificLowerLimitNorm' TINYINT (1) NOT NULL,	-- Enum: 1 = None, 2 = Sufficient, 3 = Insufficient, 4 = NotAssessed
-	'DetailedAssessmentResultForLowerLimitNorm' TINYINT (1) NOT NULL,	-- Enum: 1 = None, 2 = Sufficient, 3 = Insufficient, 4 = NotAssessed
-	'DetailedAssessmentResultForFactorizedLowerLimitNorm' TINYINT (1) NOT NULL,	-- Enum: 1 = None, 2 = Sufficient, 3 = Insufficient, 4 = NotAssessed
-	'TailorMadeAssessmentResult' TINYINT (1) NOT NULL,	-- Enum: 1 = None, 2 = Iv, 3 = IIv, 4 = IIIv, 5 = IVv, 6 = Vv, 7 = VIv, 8 = VIIv
-	'UseManualAssembly' TINYINT (1) NOT NULL,	-- true or false
-	'ManualAssemblyCategoryGroup' TINYINT (1) NOT NULL,	-- Enum: 1 = None, 2 = NotApplicable 3 = Iv, 4 = IIv, 5 = IIIv, 6 = IVv, 7 = Vv, 8 = VIv, 9 = VIIv
+	'IsRelevant' TINYINT (1) NOT NULL,	-- true or false
+	'InitialFailureMechanismResultType' TINYINT (1) NOT NULL,	-- Enum: Manual = 1 NoFailureProbability = 2
+	'ManualInitialFailureMechanismResultSectionProbability' REAL NULL,
+	'ManualInitialFailureMechanismResultProfileProbability' REAL NULL,
+	'FurtherAnalysisNeeded' TINYINT (1) NOT NULL,	-- true or false
+	'RefinedSectionProbability' REAL NULL,
+	'RefinedProfileProbability' REAL NULL,
 	CONSTRAINT 'FK_WaveImpactAsphaltCoverSectionResultEntity_FailureMechanismSectionEntity' FOREIGN KEY ('FailureMechanismSectionEntityId') REFERENCES 'FailureMechanismSectionEntity' ('FailureMechanismSectionEntityId') ON DELETE Cascade ON UPDATE Cascade
 )
 ;
