Index: build/DatabaseStructure.sql
===================================================================
diff -u -r76c9a0918464ee397f26c99770a8de1f83cbf3b9 -r2c1f66c35b88e58c176a32db511cd631d36a2838
--- build/DatabaseStructure.sql	(.../DatabaseStructure.sql)	(revision 76c9a0918464ee397f26c99770a8de1f83cbf3b9)
+++ build/DatabaseStructure.sql	(.../DatabaseStructure.sql)	(revision 2c1f66c35b88e58c176a32db511cd631d36a2838)
@@ -1,6 +1,6 @@
 /* ---------------------------------------------------- */
 /*  Generated by Enterprise Architect Version 14.1 		*/
-/*  Created On : 14-jul-2020 14:27:20 				*/
+/*  Created On : 05-aug-2020 08:38:49 				*/
 /*  DBMS       : SQLite 								*/
 /* ---------------------------------------------------- */
 
@@ -1576,11 +1576,8 @@
 	'PipingCalculationEntityId' INTEGER NOT NULL,
 	'Order' INT (4) NOT NULL,
 	'HeaveFactorOfSafety' REAL NULL,
-	'HeaveZValue' REAL NULL,
 	'UpliftFactorOfSafety' REAL NULL,
-	'UpliftZValue' REAL NULL,
 	'SellmeijerFactorOfSafety' REAL NULL,
-	'SellmeijerZValue' REAL NULL,
 	'UpliftEffectiveStress' REAL NULL,
 	'HeaveGradient' REAL NULL,
 	'SellmeijerCreepCoefficient' REAL NULL,
