Index: build/DatabaseStructure.sql
===================================================================
diff -u -r792783dc3dbac72f6f55448ed80e78f6b25c0071 -r280802fc6ecb02c236b48bbbc4ce3092b89a7d39
--- build/DatabaseStructure.sql	(.../DatabaseStructure.sql)	(revision 792783dc3dbac72f6f55448ed80e78f6b25c0071)
+++ build/DatabaseStructure.sql	(.../DatabaseStructure.sql)	(revision 280802fc6ecb02c236b48bbbc4ce3092b89a7d39)
@@ -1,6 +1,6 @@
 /* ---------------------------------------------------- */
 /*  Generated by Enterprise Architect Version 12.0 		*/
-/*  Created On : 10-jan-2017 11:54:45 				*/
+/*  Created On : 12-Jan-2017 2:31:23 PM 				*/
 /*  DBMS       : SQLite 								*/
 /* ---------------------------------------------------- */
 
@@ -1325,7 +1325,7 @@
 	'TargetReliability' REAL,
 	'CalculatedProbability' REAL,
 	'CalculatedReliability' REAL,
-	'CalculationConvergence' TINYINT (1) NOT NULL,
+	'CalculationConvergence' TINYINT (1) NOT NULL, -- Enum: 1 = NotCalculated, 2 = CalculatedNotConverged, 3 = CalculatedConverged
 	CONSTRAINT 'FK_DuneLocationOutputEntity_DuneLocationEntity' FOREIGN KEY ('DuneLocationEntityId') REFERENCES 'DuneLocationEntity' ('DuneLocationEntityId') ON DELETE Cascade ON UPDATE Cascade
 )
 ;
