Index: build/DatabaseStructure.sql
===================================================================
diff -u -r7b4e976738871759292c8219091bae62b966acae -r205e9cf82202fa7ccd49231b221763d8dfe7aa68
--- build/DatabaseStructure.sql	(.../DatabaseStructure.sql)	(revision 7b4e976738871759292c8219091bae62b966acae)
+++ build/DatabaseStructure.sql	(.../DatabaseStructure.sql)	(revision 205e9cf82202fa7ccd49231b221763d8dfe7aa68)
@@ -1,6 +1,6 @@
 /* ---------------------------------------------------- */
 /*  Generated by Enterprise Architect Version 12.0 		*/
-/*  Created On : 10-Oct-2017 16:27:55 				*/
+/*  Created On : 11-Oct-2017 08:05:59 				*/
 /*  DBMS       : SQLite 								*/
 /* ---------------------------------------------------- */
 
@@ -1689,6 +1689,7 @@
 	'TangentLineDeterminationType' TINYINT (1) NOT NULL, -- Enumtype: 1 = Specified, 2 = LayerSeparated
 	'TangentLineZTop' REAL,
 	'TangentLineZBottom' REAL,
+	'TangentLineNumber' INT (4) NOT NULL,
 	'LeftGridXLeft' REAL,
 	'LeftGridXRight' REAL,
 	'LeftGridNrOfHorizontalPoints' INT (4) NOT NULL,
