Index: build/DatabaseStructure.sql
===================================================================
diff -u -rc020cda27aa3558aee28cce5cd2ec537ee6a9af4 -r22b6b1b34a6c769ffa7d16b7b8eef922bd7290f5
--- build/DatabaseStructure.sql	(.../DatabaseStructure.sql)	(revision c020cda27aa3558aee28cce5cd2ec537ee6a9af4)
+++ build/DatabaseStructure.sql	(.../DatabaseStructure.sql)	(revision 22b6b1b34a6c769ffa7d16b7b8eef922bd7290f5)
@@ -1,6 +1,6 @@
 /* ---------------------------------------------------- */
 /*  Generated by Enterprise Architect Version 12.0 		*/
-/*  Created On : 21-Mar-2018 16:44:30 				*/
+/*  Created On : 22-Mar-2018 11:36:08 				*/
 /*  DBMS       : SQLite 								*/
 /* ---------------------------------------------------- */
 
@@ -356,14 +356,14 @@
 (
 	'AssessmentSectionEntityId' INTEGER NOT NULL PRIMARY KEY AUTOINCREMENT,
 	'ProjectEntityId' INTEGER NOT NULL,
-	'HydraulicLocationCalculationCollectionEntity1Id' INTEGER NOT NULL,
-	'HydraulicLocationCalculationCollectionEntity2Id' INTEGER NOT NULL,
-	'HydraulicLocationCalculationCollectionEntity3Id' INTEGER NOT NULL,
-	'HydraulicLocationCalculationCollectionEntity4Id' INTEGER NOT NULL,
-	'HydraulicLocationCalculationCollectionEntity5Id' INTEGER NOT NULL,
-	'HydraulicLocationCalculationCollectionEntity6Id' INTEGER NOT NULL,
-	'HydraulicLocationCalculationCollectionEntity7Id' INTEGER NOT NULL,
-	'HydraulicLocationCalculationCollectionEntity8Id' INTEGER NOT NULL,
+	'HydraulicLocationCalculationCollectionEntity1Id' INTEGER NOT NULL, -- Represents the design water level factorized signaling norm
+	'HydraulicLocationCalculationCollectionEntity2Id' INTEGER NOT NULL, -- Represents the design water level signaling norm
+	'HydraulicLocationCalculationCollectionEntity3Id' INTEGER NOT NULL, -- Represents the design water level lower limit norm
+	'HydraulicLocationCalculationCollectionEntity4Id' INTEGER NOT NULL, -- Represents the design water level factorized lower limit norm
+	'HydraulicLocationCalculationCollectionEntity5Id' INTEGER NOT NULL, -- Represents the wave height factorized signaling norm
+	'HydraulicLocationCalculationCollectionEntity6Id' INTEGER NOT NULL, -- Represents the wave height signaling norm
+	'HydraulicLocationCalculationCollectionEntity7Id' INTEGER NOT NULL, -- Represents the wave height lower limit norm
+	'HydraulicLocationCalculationCollectionEntity8Id' INTEGER NOT NULL, -- Represents the wave height factorized lower limit norm
 	'Id' TEXT,
 	'Name' VARCHAR (260),
 	'Comments' TEXT,
