Index: build/DatabaseStructure.sql
===================================================================
diff -u -rc03d261f67b4fccb343a8be6224c0133cbd3edfb -r2dae9254a8a2e4e49235932528a6626908014132
--- build/DatabaseStructure.sql	(.../DatabaseStructure.sql)	(revision c03d261f67b4fccb343a8be6224c0133cbd3edfb)
+++ build/DatabaseStructure.sql	(.../DatabaseStructure.sql)	(revision 2dae9254a8a2e4e49235932528a6626908014132)
@@ -1,6 +1,6 @@
 /* ---------------------------------------------------- */
 /*  Generated by Enterprise Architect Version 12.0 		*/
-/*  Created On : 03-Aug-2018 15:17:58 				*/
+/*  Created On : 08-Aug-2018 11:05:34 				*/
 /*  DBMS       : SQLite 								*/
 /* ---------------------------------------------------- */
 
@@ -1368,7 +1368,7 @@
 	'CriticalOvertoppingDischargeCoefficientOfVariation' REAL,
 	'FlowWidthAtBottomProtectionMean' REAL,
 	'FlowWidthAtBottomProtectionStandardDeviation' REAL,
-	'ProbabilityOrFrequencyOpenStructureBeforeFlooding' REAL,
+	'ProbabilityOpenStructureBeforeFlooding' REAL,
 	'FailureProbabilityOpenStructure' REAL,
 	'IdenticalApertures' INT (4) NOT NULL,
 	'FailureProbabilityReparation' REAL,
@@ -1412,7 +1412,7 @@
 	'CriticalOvertoppingDischargeCoefficientOfVariation' REAL,
 	'FlowWidthAtBottomProtectionMean' REAL,
 	'FlowWidthAtBottomProtectionStandardDeviation' REAL,
-	'ProbabilityOrFrequencyOpenStructureBeforeFlooding' REAL NOT NULL,
+	'ProbabilityOpenStructureBeforeFlooding' REAL NOT NULL,
 	'FailureProbabilityOpenStructure' REAL NOT NULL,
 	'IdenticalApertures' INT (4) NOT NULL,
 	'FailureProbabilityReparation' REAL NOT NULL,
