Index: build/DatabaseStructure.sql
===================================================================
diff -u -rc3f8f8f9ce4133a7651b3270417168c3857aa68c -r315365dcbc703f89e1152352f7b869f4dec66b3d
--- build/DatabaseStructure.sql	(.../DatabaseStructure.sql)	(revision c3f8f8f9ce4133a7651b3270417168c3857aa68c)
+++ build/DatabaseStructure.sql	(.../DatabaseStructure.sql)	(revision 315365dcbc703f89e1152352f7b869f4dec66b3d)
@@ -1,6 +1,6 @@
 /* ---------------------------------------------------- */
 /*  Generated by Enterprise Architect Version 16.1 		*/
-/*  Created On : 25-mei-2023 12:58:18 				*/
+/*  Created On : 27-feb-2024 16:36:22 				*/
 /*  DBMS       : SQLite 								*/
 /* ---------------------------------------------------- */
 
@@ -332,6 +332,7 @@
 	NormativeProbabilityType TINYINT (1) NOT NULL,	-- EnumType: 1 = MaximumAllowableFloodingProbability, 2 = SignalFloodingProbability
 	Composition TINYINT (1) NOT NULL,	-- Enum: 1 = Dike, 2 = Dune, 3 = DikeAndDune
 	ReferenceLinePointXml TEXT NULL COLLATE NOCASE,
+	AreFailureMechanismsCorrelated TINYINT (1) NOT NULL,	-- true or false
 	CONSTRAINT FK_AssessmentSectionEntity_HydraulicLocationCalculationCollectionEntity1 FOREIGN KEY (HydraulicLocationCalculationCollectionEntity1Id) REFERENCES HydraulicLocationCalculationCollectionEntity (HydraulicLocationCalculationCollectionEntityId) ON DELETE No Action ON UPDATE Cascade,
 	CONSTRAINT FK_AssessmentSectionEntity_HydraulicLocationCalculationCollectionEntity2 FOREIGN KEY (HydraulicLocationCalculationCollectionEntity2Id) REFERENCES HydraulicLocationCalculationCollectionEntity (HydraulicLocationCalculationCollectionEntityId) ON DELETE No Action ON UPDATE Cascade,
 	CONSTRAINT FK_AssessmentSectionEntity_ProjectEntity FOREIGN KEY (ProjectEntityId) REFERENCES ProjectEntity (ProjectEntityId) ON DELETE Cascade ON UPDATE Cascade,
