Index: build/DatabaseStructure.sql
===================================================================
diff -u -rd26292c377e29551dcc82202c48cfbcee709f7c8 -re3b819f8767dbab18a081ebd96f7140fcfff47f6
--- build/DatabaseStructure.sql	(.../DatabaseStructure.sql)	(revision d26292c377e29551dcc82202c48cfbcee709f7c8)
+++ build/DatabaseStructure.sql	(.../DatabaseStructure.sql)	(revision e3b819f8767dbab18a081ebd96f7140fcfff47f6)
@@ -1,6 +1,6 @@
 /* ---------------------------------------------------- */
 /*  Generated by Enterprise Architect Version 12.0 		*/
-/*  Created On : 11-Oct-2017 11:16:36 				*/
+/*  Created On : 13-Oct-2017 11:26:13 				*/
 /*  DBMS       : SQLite 								*/
 /* ---------------------------------------------------- */
 
@@ -1704,17 +1704,11 @@
 	'RightGridNrOfVerticalPoints' INT (4) NOT NULL,
 	'DikeSoilScenarioType' TINYINT (1) NOT NULL, -- Enumtype: 1 = ClayDikeOnClay, 2 = SandDikeOnClay, 3 = ClayDikeOnSand, 4 = SandDikeOnSand
 	'WaterLevelRiverAverage' REAL,
-	'WaterLevelPolder' REAL,
 	'DrainageConstructionPresent' TINYINT (1) NOT NULL, -- true or false
 	'DrainageConstructionCoordinateX' REAL,
 	'DrainageConstructionCoordinateZ' REAL,
 	'MinimumLevelPhreaticLineAtDikeTopRiver' REAL,
 	'MinimumLevelPhreaticLineAtDikeTopPolder' REAL,
-	'UseDefaultOffsets' TINYINT (1) NOT NULL, -- true or false
-	'PhreaticLineOffsetBelowDikeTopAtRiver' REAL,
-	'PhreaticLineOffsetBelowDikeTopAtPolder' REAL,
-	'PhreaticLineOffsetBelowShoulderBaseInside' REAL,
-	'PhreaticLineOffsetBelowDikeToeAtPolder' REAL,
 	'AdjustPhreaticLine3And4ForUplift' TINYINT (1) NOT NULL, -- true or false
 	'LeakageLengthOutwardsPhreaticLine3' REAL,
 	'LeakageLengthInwardsPhreaticLine3' REAL,
