Index: build/DatabaseStructure.sql
===================================================================
diff -u -rdea5708b2c085512ce1724cf19eab59e79bc78c6 -r8e8b21164018eea7caf740234fff33a7ea9c5157
--- build/DatabaseStructure.sql	(.../DatabaseStructure.sql)	(revision dea5708b2c085512ce1724cf19eab59e79bc78c6)
+++ build/DatabaseStructure.sql	(.../DatabaseStructure.sql)	(revision 8e8b21164018eea7caf740234fff33a7ea9c5157)
@@ -1,6 +1,6 @@
 /* ---------------------------------------------------- */
 /*  Generated by Enterprise Architect Version 16.1 		*/
-/*  Created On : 05-mei-2023 15:02:30 				*/
+/*  Created On : 12-mei-2023 15:15:12 				*/
 /*  DBMS       : SQLite 								*/
 /* ---------------------------------------------------- */
 
@@ -360,7 +360,7 @@
 	InAssemblyOutputComments TEXT NULL COLLATE NOCASE,
 	NotInAssemblyComments TEXT NULL COLLATE NOCASE,
 	CalculationsInputComments TEXT NULL COLLATE NOCASE,
-	FailureMechanismAssemblyResultProbabilityResultType TINYINT (1) NOT NULL,	-- Enum: Automatic = 1, Manual = 2
+	FailureMechanismAssemblyResultProbabilityResultType TINYINT (1) NOT NULL,	-- Enum: None = 1, AutomaticIndependentSections = 2, AutomaticWorstSectionOrProfile = 3, Manual = 4
 	FailureMechanismAssemblyResultManualFailureMechanismAssemblyProbability REAL NULL,
 	CONSTRAINT FK_FailureMechanismEntity_AssessmentSectionEntity FOREIGN KEY (AssessmentSectionEntityId) REFERENCES AssessmentSectionEntity (AssessmentSectionEntityId) ON DELETE Cascade ON UPDATE Cascade,
 	CONSTRAINT FK_FailureMechanismEntity_CalculationGroupEntity FOREIGN KEY (CalculationGroupEntityId) REFERENCES CalculationGroupEntity (CalculationGroupEntityId) ON DELETE Cascade ON UPDATE Cascade,
@@ -1635,7 +1635,7 @@
 	InAssemblyOutputComments TEXT NULL COLLATE NOCASE,
 	NotInAssemblyComments TEXT NULL COLLATE NOCASE,
 	N REAL NOT NULL,
-	FailureMechanismAssemblyResultProbabilityResultType TINYINT (1) NOT NULL,	-- Enum: Automatic = 1, Manual = 2
+	FailureMechanismAssemblyResultProbabilityResultType TINYINT (1) NOT NULL,	-- Enum: None = 1, AutomaticIndependentSections = 2, AutomaticWorstSectionOrProfile = 3, Manual = 4
 	FailureMechanismAssemblyResultManualFailureMechanismAssemblyProbability REAL NULL,
 	ApplyLengthEffectInSection TINYINT (1) NOT NULL,
 	CONSTRAINT FK_SpecificFailureMechanismEntity_AssessmentSectionEntity FOREIGN KEY (AssessmentSectionEntityId) REFERENCES AssessmentSectionEntity (AssessmentSectionEntityId) ON DELETE Cascade ON UPDATE Cascade
