Index: build/DatabaseStructure.sql
===================================================================
diff -u -rf71c2df965b0227efc953a0c3eca4692fcf3ba84 -rc5d1208e4dfa8365da1db240c25e2bd1a94d6064
--- build/DatabaseStructure.sql	(.../DatabaseStructure.sql)	(revision f71c2df965b0227efc953a0c3eca4692fcf3ba84)
+++ build/DatabaseStructure.sql	(.../DatabaseStructure.sql)	(revision c5d1208e4dfa8365da1db240c25e2bd1a94d6064)
@@ -1,6 +1,6 @@
 /* ---------------------------------------------------- */
 /*  Generated by Enterprise Architect Version 16.1 		*/
-/*  Created On : 13-jun-2024 11:23:36 				*/
+/*  Created On : 24-jun-2024 07:58:24 				*/
 /*  DBMS       : SQLite 								*/
 /* ---------------------------------------------------- */
 
@@ -518,7 +518,7 @@
 (
 	PipingFailureMechanismSectionConfigurationEntityId INTEGER NOT NULL PRIMARY KEY AUTOINCREMENT,
 	FailureMechanismSectionEntityId INTEGER NOT NULL,
-	PipingScenarioConfigurationPerFailureMechanismSectionType TINYINT (1) NOT NULL,	-- Enum: SemiProbabilistic = 1 Probabilistic = 2
+	ScenarioConfigurationType TINYINT (1) NOT NULL,	-- Enum: SemiProbabilistic = 1 Probabilistic = 2
 	A REAL NOT NULL,
 	CONSTRAINT FK_PipingFailureMechanismSectionConfigurationEntity_FailureMechanismSectionEntity FOREIGN KEY (FailureMechanismSectionEntityId) REFERENCES FailureMechanismSectionEntity (FailureMechanismSectionEntityId) ON DELETE Cascade ON UPDATE Cascade
 )
@@ -1314,7 +1314,7 @@
 CREATE TABLE MacroStabilityInwardsFailureMechanismSectionConfigurationEntity
 (
 	MacroStabilityInwardsFailureMechanismSectionConfigurationEntityId INTEGER NOT NULL PRIMARY KEY AUTOINCREMENT,
-	FailureMechanismSectionEntityId INTEGER NULL,
+	FailureMechanismSectionEntityId INTEGER NOT NULL,
 	A REAL NOT NULL,
 	CONSTRAINT FK_MacroStabilityInwardsFailureMechanismSectionConfigurationEntity_FailureMechanismSectionEntity FOREIGN KEY (FailureMechanismSectionEntityId) REFERENCES FailureMechanismSectionEntity (FailureMechanismSectionEntityId) ON DELETE Cascade ON UPDATE Cascade
 )
@@ -1454,7 +1454,7 @@
 	WaterVolumetricWeight REAL NOT NULL,
 	StochasticSoilModelCollectionSourcePath TEXT NULL COLLATE NOCASE,
 	SurfaceLineCollectionSourcePath TEXT NULL COLLATE NOCASE,
-	PipingScenarioConfigurationType TINYINT (1) NOT NULL,	-- Enum:  SemiProbabilistic = 1 Probabilistic = 2 PerFailureMechanismSection = 3
+	ScenarioConfigurationType TINYINT (1) NOT NULL,	-- Enum:  SemiProbabilistic = 1 Probabilistic = 2 PerFailureMechanismSection = 3
 	CONSTRAINT FK_PipingFailureMechanismMetaEntity_FailureMechanismEntity FOREIGN KEY (FailureMechanismEntityId) REFERENCES FailureMechanismEntity (FailureMechanismEntityId) ON DELETE Cascade ON UPDATE Cascade
 )
 ;
