Index: doc/manual/chapters/wti_guide.tex
===================================================================
diff -u -r8adcf0e2b20bdeca6b2e587d783b205a2e250de9 -ra3c869f5e6ea258f8c1dc3d0d0c63783f5451235
--- doc/manual/chapters/wti_guide.tex	(.../wti_guide.tex)	(revision 8adcf0e2b20bdeca6b2e587d783b205a2e250de9)
+++ doc/manual/chapters/wti_guide.tex	(.../wti_guide.tex)	(revision a3c869f5e6ea258f8c1dc3d0d0c63783f5451235)
@@ -8,8 +8,6 @@
 \section{Overzicht}
 Om de toegankelijkheid van deze handleiding te bevorderen, wordt er een overzicht van alle onderdelen geïntroduceerd.
 
-\Autoref{chap:ds_background}: \nameref{chap:ds_background}, introduces the framework as an integrated modeling environment to provide users with a single application which acts as a platform to integrate various calculations and tools.
-
 \Autoref{chap:ds_overview}: \nameref{chap:ds_overview}, gives a brief introduction to all GUI-components, which are shared between fail mechanisms based on the framework.
 
 \section{Manual version and revisions}
